         180           8
  -73.7184537769424       -17.8757097324381        7.84905569538362     
   17.4173398632637       -4141.52438754321       -68413.8661422195     
  -465714.939562877       -2045572.35380504     
   299.880397674920       -9.58887533573431        16.5775390382273     
   38.1209687322889       -9767.08265821339       -173846.641110691     
  -1241567.77252553       -5639441.02469161     
 -1.737688120822680E-003  0.000000000000000E+000
   1.00239549774695       0.000000000000000E+000
  0.997264721292737       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
