         180           8
  0.735155439580255       3.878193209310952E-002 -0.665235837832582     
  -1.29245808678256       -1.93121216885198       -2.46403571483671     
  -3.04949232184240       -3.69546880474057     
  -18.1236203203613       -17.2038303354742       -17.0859720487100     
  -17.0776215802291       -17.1418958796607       -17.2766277694989     
  -17.3707199553213       -17.2366793659845     
 -1.505978374605148E-003  0.000000000000000E+000
  0.992195863876385       0.000000000000000E+000
  0.992840542983343       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
