         180           8
   8.86993390447767        8.28588925026095        7.76177760197887     
   7.22618618601965        6.69930775221422        6.16704103077284     
   5.64447140836483        5.04600720921456     
   15.0072898220606        15.1984643596195        15.3877618959088     
   15.6134178444256        15.9209777503424        16.2142689882246     
   16.3833107308524        16.5450450298994     
 -8.957059053847705E-004  0.000000000000000E+000
   1.00136588360671       0.000000000000000E+000
  0.997695001719607       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
