         180           8
  0.434990308454579      -0.210854382437526      -0.829143020291797     
  -1.47893072890316       -2.06637502988071       -2.61276034416333     
  -3.17565522351392       -3.74710849865830     
  -14.8170488158231       -15.0451701374301       -15.2061589819012     
  -15.3732122727894       -15.5765876131823       -15.8431988540945     
  -16.0639820543778       -16.1582185285321     
 -1.363468948586908E-003  0.000000000000000E+000
  0.992317297371221       0.000000000000000E+000
  0.994431993054490       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
