         180           2
  0.609319190929587       -3.76226858022883     
  -17.1611718847163       -17.2701604297554     
 -1.525397560133705E-003  0.000000000000000E+000
  0.992020700611186       0.000000000000000E+000
  0.992686727677021       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
