         180           3
  0.470051888332611        2.20366001699019        4.14682069963661     
   13.1932652232400        13.7530775716968        14.3443032649576     
 -7.715211622851322E-004  0.000000000000000E+000
   1.00145626108810       0.000000000000000E+000
  0.998091918332158       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
