         180           8
  -1.32676311055356       -1.47098914313226       -1.59852244856194     
  -1.72417570675758       -1.85439217608134       -1.97961566220065     
  -2.04006267629009       -2.10273060413926     
  -21.0921951122441       -20.9989424330550       -20.7002360121548     
  -20.4317005884042       -20.1507730475423       -19.8099739334612     
  -19.4787332934277       -19.0205106259018     
 -1.742105742143494E-003  0.000000000000000E+000
  0.992661812672110       0.000000000000000E+000
  0.995591949883331       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
