         180           3
  0.413006281959364        2.14917301552898        4.10062582517906     
   12.9705326732806        13.7491499318584        14.4449128351338     
 -7.523088311646248E-004  0.000000000000000E+000
   1.00143664012576       0.000000000000000E+000
  0.998131870406180       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
