         180           8
  -1.24670303755852       -1.47175288899280       -1.58820616195259     
  -1.69401785940367       -1.81313206674489       -1.97218979489418     
  -2.04823345355695       -2.24966035100715     
  -21.5920505319588       -21.2314665239280       -20.8213439155648     
  -20.4894006453752       -20.2235972679271       -19.8695157737163     
  -19.4554132334078       -19.0388676652991     
 -1.818311870648241E-003  0.000000000000000E+000
  0.992643696514542       0.000000000000000E+000
  0.995551349997048       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
