         180           8
  -1.44040926893940       -1.65682476750827       -1.82375296043330     
  -1.96210085031686       -2.08640504266268       -2.22007935174480     
  -2.28312890725838       -2.39588786295119     
  -21.2968429196578       -21.0499720806508       -20.7638011998719     
  -20.4668713275950       -20.1824775042887       -19.8371232376674     
  -19.4364491044109       -19.1351858805497     
 -2.021960713414888E-003  0.000000000000000E+000
  0.993063597620382       0.000000000000000E+000
  0.995765153021273       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
