         180           8
  -1.83705708503047       -2.02476544978771       -2.12883566898573     
  -2.25322828622112       -2.38180707264595       -2.49672580377888     
  -2.55016886094557       -2.71128619612937     
  -21.3817424156790       -21.0927839761343       -20.7817268482776     
  -20.4190584775452       -20.0839893809656       -19.7778868705212     
  -19.3674084700795       -18.9705759327857     
 -1.838031730281681E-003  0.000000000000000E+000
  0.992894474624514       0.000000000000000E+000
  0.995747488859692       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
