         180           3
  0.290594803675834        2.02565639896359        3.96215976208612     
   13.0397059499650        13.6086204416102        14.2420758065054     
 -8.261990067143473E-004  0.000000000000000E+000
   1.00142749584185       0.000000000000000E+000
  0.998243886148213       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
