         180           8
  -1.56825553702218       -1.76154482112284       -1.89593331713530     
  -2.02240919081807       -2.14303696506457       -2.24424008034605     
  -2.30294599800395       -2.41043565220773     
  -21.4316591176470       -21.1886712145093       -20.9162874093912     
  -20.6260428633624       -20.2938790319405       -19.9592104805804     
  -19.6158814247893       -19.2122803872245     
 -1.867610347111847E-003  0.000000000000000E+000
  0.992821609540610       0.000000000000000E+000
  0.995799457976100       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
