         180           8
  -1.74216691646851       -1.82864814285685       -1.97007520688486     
  -2.05812333179466       -2.17660258590554       -2.30963179633697     
  -2.42228088606103       -2.47518883537529     
  -21.5268733256100       -21.1391169305157       -20.8613041280752     
  -20.5422211959764       -20.2596740915369       -19.9349874268422     
  -19.5683628443922       -19.1588169813455     
 -1.979975622821159E-003  0.000000000000000E+000
  0.992920153199369       0.000000000000000E+000
  0.995796303494770       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
