         180           8
  -1.43298511356095       -1.65285158474092       -1.82044337861095     
  -1.96092189616523       -2.08505371220996       -2.21882774948748     
  -2.28153023691524       -2.39465888431620     
  -21.2971245524462       -21.0461629411967       -20.7619290610711     
  -20.4644630091425       -20.1788950323603       -19.8376356066712     
  -19.4401651010522       -19.1363251826492     
 -2.028779659914968E-003  0.000000000000000E+000
  0.993061168364749       0.000000000000000E+000
  0.995795343429740       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
