         180           3
  0.541275901710781        2.22651875766916        4.13148957396066     
   12.4283624090387        13.0758200125317        13.6421983467834     
 -7.868404813638710E-004  0.000000000000000E+000
   1.00152894982194       0.000000000000000E+000
  0.997997044087275       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
