         180           8
 -0.825583322356613       -1.04934179203914       -1.17709737616894     
  -1.36111982421308       -1.49623693774690       -1.60897024293894     
  -1.69408689877944       -1.93786620117795     
  -21.9922707259343       -21.6745940482714       -21.3746222910233     
  -21.0809455204327       -20.7798488759645       -20.4088863987718     
  -19.9947461394190       -19.6708359019278     
 -1.697249254127005E-003  0.000000000000000E+000
  0.992573932960610       0.000000000000000E+000
  0.995566345078294       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
