         180           8
 -0.905115958382517       -1.11773468198548       -1.24783329185537     
  -1.32019440093604       -1.40049107498627       -1.54512721342636     
  -1.61617413382339       -1.78555320464264     
  -21.8598474743966       -21.6730697595318       -21.4273266566723     
  -21.1525735088324       -20.8784166050401       -20.5290671834363     
  -20.1333637579158       -19.7858369071307     
 -1.724121586973488E-003  0.000000000000000E+000
  0.992569619277738       0.000000000000000E+000
  0.995466652271166       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
