         180           8
 -0.956844468429338       -1.06419028261397       -1.22397241793368     
  -1.36963120027827       -1.45649045326089       -1.54642197233900     
  -1.67074448358159       -1.71956328430204     
  -22.1136993730506       -21.8372580977295       -21.5931686041669     
  -21.2280524815636       -20.8951557652705       -20.5777445554819     
  -20.2026130698019       -19.6836872874014     
 -1.783129923672899E-003  0.000000000000000E+000
  0.992551382492724       0.000000000000000E+000
  0.995388034023098       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
