         180           3
  0.125383583459551        1.91325034442174        3.93152275624379     
   11.7339782462419        12.6556844955699        13.5641054102501     
 -7.545116889374529E-004  0.000000000000000E+000
   1.00147643793571       0.000000000000000E+000
  0.998120855162043       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
