         180           8
 -0.820456736297650       -1.05453284893538       -1.15572709043927     
  -1.25963652668843       -1.38063772835701       -1.51030711589249     
  -1.57418183816995       -1.71304475849220     
  -22.5910648919557       -22.3189342138494       -21.9915796380367     
  -21.6544023165885       -21.2892884349647       -20.8970738514687     
  -20.4893683805885       -19.9688219820521     
 -1.782413498426609E-003  0.000000000000000E+000
  0.992607740896761       0.000000000000000E+000
  0.995382818194023       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
