         180           3
 -8.859211956326485E-002   1.58277017057291        3.70199548686627     
   11.6263322272798        12.0406204403958        12.9965828405099     
 -7.553524965077062E-004  0.000000000000000E+000
   1.00158206657919       0.000000000000000E+000
  0.998223981725673       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
