         180           8
 -0.545139034006941      -0.798918716893769      -0.972836011159895     
  -1.17698560607185       -1.32474310438232       -1.42434682389701     
  -1.52665333337472       -1.64012802081963     
  -22.7657435175001       -22.5946057020947       -22.3614168324144     
  -22.0507194485171       -21.7689658076397       -21.3706108726361     
  -20.9010573228849       -20.4655278360650     
 -1.925504487568167E-003  0.000000000000000E+000
  0.992881568925494       0.000000000000000E+000
  0.995656650483179       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
