         180           3
  0.343980026259393        2.03078338496996        3.91501030858398     
   11.3873879266538        12.1499031927052        12.7866457930403     
 -7.378875786123690E-004  0.000000000000000E+000
   1.00151936760072       0.000000000000000E+000
  0.998207051825109       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
