         180           8
 -0.980786670330062       -1.08203511286006       -1.24507518063973     
  -1.38490446543870       -1.47584547055161       -1.56460019324118     
  -1.66830181433367       -1.67970579943351     
  -23.2793662357251       -23.0925098312171       -22.7608182266579     
  -22.4468654922541       -22.1323291018299       -21.7223307579953     
  -21.3001257026412       -20.8170763449709     
 -1.910091130051076E-003  0.000000000000000E+000
  0.992756995095381       0.000000000000000E+000
  0.995637662568120       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
