         180           3
  0.414626528975014        2.06152719269088        4.11354874164630     
   10.9721026612986        11.5362103703263        12.1367011531159     
 -7.272568317059670E-004  0.000000000000000E+000
   1.00146340739720       0.000000000000000E+000
  0.998402185388787       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
