         180           8
 -0.906686895732634       -1.16623154666695       -1.30833406457336     
  -1.44921973057832       -1.56249805541378       -1.69911956165105     
  -1.77227706814242       -1.82575265225881     
  -23.2588468265813       -23.0438754427391       -22.7874682450543     
  -22.4707275657772       -22.1169085124453       -21.7289058651452     
  -21.3258907897114       -20.8128558577222     
 -2.089030948015021E-003  0.000000000000000E+000
  0.992878756307667       0.000000000000000E+000
  0.996062327209659       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
