         180           3
 -0.223548929108005        1.57712292861653        3.45977703463871     
   10.9560479297594        11.4558295077545        12.3376348071709     
 -7.031245811664054E-004  0.000000000000000E+000
   1.00158117999972       0.000000000000000E+000
  0.998502123082105       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
