         180           8
  0.129475288822871       1.318624432453136E-003 -0.203476325736530     
 -0.408345195646708      -0.533384513212044      -0.626910938929488     
 -0.759609181419929      -0.923489977204174     
  -23.4128275258612       -23.0986047186772       -22.7937616530348     
  -22.4637377978020       -22.0757646784012       -21.6547291103928     
  -21.2652003639695       -20.8060978025600     
 -2.123199330726886E-003  0.000000000000000E+000
  0.992905031712803       0.000000000000000E+000
  0.995966538160190       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
