         180           3
 -0.682600229868252        1.14325810002665        3.14016441739906     
   11.9603421802760        12.1110221412936        12.9873168072589     
 -6.905732022830291E-004  0.000000000000000E+000
   1.00164537089183       0.000000000000000E+000
  0.998484963766397       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
