         180           8
  0.217619429124445      -6.787243918173742E-002 -0.226947660087800     
 -0.380057216941546      -0.527236540569851      -0.690932111107204     
 -0.825175813131548      -0.954729102336080     
  -22.3890421058435       -22.0981776788778       -21.8454541037754     
  -21.5292620042990       -21.1589112428592       -20.7990529851814     
  -20.4219112474141       -20.0134734641090     
 -2.149278855442106E-003  0.000000000000000E+000
  0.993077039416967       0.000000000000000E+000
  0.996028802725465       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
