         180           8
   1.53505906402979        1.22290668561978       0.854991233970196     
  0.524382577499793       0.174474460869642      -0.114722401542778     
 -0.321547959644352      -0.361542541969127     
  -22.6417391051992       -22.8919761073838       -23.1151174792791     
  -23.6675329375887       -24.5443406809449       -25.2269708181865     
  -25.6219813795109       -26.0335267588531     
 -1.909357101545896E-003  0.000000000000000E+000
  0.992849288844265       0.000000000000000E+000
  0.995984603468554       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
