         180           8
 -2.305560295291182E-002 -0.418819538721548      -0.981063624312017     
  -1.54378448104097       -2.08263327756258       -2.55082150655974     
  -2.91496433680469       -3.19651249453666     
   12.9630095672862        13.0240809749734        13.0489588253449     
   13.0745814304793        13.1484505610921        13.2110752015965     
   13.2536687660576        13.2167656355535     
 -7.153079486676935E-004  0.000000000000000E+000
   1.00112491244383       0.000000000000000E+000
  0.998125121863136       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
