         180           8
  -1.56527412665203       -1.86302482938976       -2.17603467315113     
  -2.50013168368758       -2.80908228123981       -3.04820406884552     
  -3.14667708350406       -3.19507300555470     
  -21.9658513454946       -22.1766640693822       -22.4076627069643     
  -22.6423866935486       -22.9252303767835       -23.1610339446361     
  -23.4093566569459       -23.6838462268223     
 -2.096596217284874E-003  0.000000000000000E+000
  0.992910876380248       0.000000000000000E+000
  0.995868133934592       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
