         180           8
 -0.388315469475943      -0.872836793231624       -1.40002888118541     
  -1.93913445101888       -2.44730517298381       -2.85488305804513     
  -3.18701796640690       -3.41266228581828     
   12.9900835567472        13.0254537449514        13.0805586043365     
   13.0835508866403        13.0765035319235        13.1231905359429     
   13.1528721518579        13.2465023174839     
 -6.295885055364755E-004  0.000000000000000E+000
   1.00097289957983       0.000000000000000E+000
  0.998164185712798       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
