         180           8
  -1.32970096585762       -1.70967384962024       -2.05315147682810     
  -2.33910732535641       -2.60621620503425       -2.83375544989099     
  -2.95458335263774       -3.00780187329008     
  -21.7812902058811       -22.0512027696542       -22.2912110304833     
  -22.5804928960393       -22.9452054607677       -23.1780695876976     
  -23.4355064161414       -23.7320164516221     
 -2.159904292641818E-003  0.000000000000000E+000
  0.992936743503892       0.000000000000000E+000
  0.995873062061486       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
