         180           8
 -0.363091635381707      -0.918721742789433       -1.41049695944738     
  -1.88180329808817       -2.32584836516453       -2.68600942256173     
  -2.97826351455685       -3.08231115689703     
   13.3681398066549        13.4075464501769        13.4629518186860     
   13.5188318204173        13.5654721305783        13.5470321241498     
   13.5242888984233        13.6763310155673     
 -8.985466051630425E-004  0.000000000000000E+000
   1.00128425139036       0.000000000000000E+000
  0.998241030390596       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
