         180           8
  -2.43674734024991       -2.77194111710895       -3.08487115793667     
  -3.37527808001309       -3.64293053319171       -3.83891982690306     
  -3.93583085439462       -3.93408436650271     
  -22.2734010185377       -22.4906052841540       -22.6906400699794     
  -22.8765061268632       -23.1231877245089       -23.4321503985807     
  -23.7121836978281       -23.8877609194264     
 -2.119793825128903E-003  0.000000000000000E+000
  0.992722411936805       0.000000000000000E+000
  0.995793328190035       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
