         180           8
 -0.266484342360284      -0.723750000583358       -1.29517745936649     
  -1.83905830216362       -2.35469534952118       -2.81117537444700     
  -3.18342558530426       -3.59348597348191     
   13.3334565349283        13.2183484529886        13.1544966152541     
   13.1136815167043        13.1153201130572        13.1684912039552     
   13.1876292536963        13.0835082967064     
 -8.254198404090591E-004  0.000000000000000E+000
   1.00139464202888       0.000000000000000E+000
  0.998238207651773       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
