         180           8
  -1.24350642062478       -1.55047205968632       -1.92774432061892     
  -2.26287342072154       -2.52619371416093       -2.77823651629250     
  -2.86560301783860       -3.03753925459843     
  -22.2320109947418       -22.5173269108553       -22.7394961042439     
  -23.0311932209402       -23.3397211295557       -23.5576969830497     
  -23.8075037742651       -24.3726918017912     
 -2.136500197496312E-003  0.000000000000000E+000
  0.992909628418293       0.000000000000000E+000
  0.995827465015280       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
