         180           8
 -0.470048622028456       -1.07415304124076       -1.58706410211206     
  -2.10450529786606       -2.65344206316751       -3.05610694534358     
  -3.38871260026030       -3.64471915626780     
   13.0962520969261        13.1320647986107        13.1612429832871     
   12.8806002019316        12.6086634991369        12.7829106114641     
   13.1626806257991        13.6307140683050     
 -8.049375902072230E-004  0.000000000000000E+000
   1.00151202694679       0.000000000000000E+000
  0.998256304595816       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
