         180           8
  -1.14492899448151       -1.48186282977598       -1.86867039692555     
  -2.19802345683269       -2.48467099736291       -2.70411729734283     
  -2.88541484729361       -2.82976191744529     
  -21.9576851408743       -22.0524647948850       -22.3292807704082     
  -22.9266147315975       -23.6874153563734       -24.0150776667978     
  -24.2377559768088       -24.5490249852171     
 -2.202078051838510E-003  0.000000000000000E+000
  0.993158656293592       0.000000000000000E+000
  0.996026123047321       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
