         180           3
  0.146382808483733       -1.80633315508872       -3.28530499526782     
   12.9562959793107        13.1273064838723        13.2731149502722     
 -7.163050473016178E-004  0.000000000000000E+000
   1.00115233564683       0.000000000000000E+000
  0.998133795876414       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
