         180           8
  -1.51216236355801       -1.86780130852308       -2.17769216981333     
  -2.50588972521151       -2.81218587866676       -3.05015199733074     
  -3.15507936882579       -3.20000987188698     
  -21.8629397154552       -22.1773170724036       -22.3961314844736     
  -22.6360987053474       -22.9144934838933       -23.1516998439580     
  -23.3974093142092       -23.6823904644463     
 -2.077506296804087E-003  0.000000000000000E+000
  0.992832676089899       0.000000000000000E+000
  0.995804455207125       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
