         180           3
 -0.291290974846019       -2.17280449385827       -3.51234166634649     
   13.0249720294412        13.0878820665992        13.1839556022146     
 -6.418818987705183E-004  0.000000000000000E+000
   1.00102933052485       0.000000000000000E+000
  0.998166042258430       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
