         180           3
 -0.347409594008223       -2.10906219517961       -3.20304782826092     
   13.3336790012603        13.5291378671396        13.5547217903418     
 -8.854811502142609E-004  0.000000000000000E+000
   1.00128157180113       0.000000000000000E+000
  0.998233110228842       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
