         180           8
  -2.43154011451311       -2.78149547506547       -3.08415422650658     
  -3.37694019493927       -3.64786918654161       -3.84165929073890     
  -3.93664138859051       -3.93966667187167     
  -22.2797203846167       -22.4911810113427       -22.6874137215351     
  -22.8739782137250       -23.1222933462679       -23.4320351554151     
  -23.7109782822098       -23.8914967622939     
 -2.123683288077412E-003  0.000000000000000E+000
  0.992704500656347       0.000000000000000E+000
  0.995795757229074       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
