         180           8
  -1.23839517789217       -1.54915023696393       -1.92683697633942     
  -2.26300778040035       -2.52769048769905       -2.77713087572708     
  -2.86857557603517       -3.01897864431592     
  -22.2248850220724       -22.5143254670431       -22.7407730906180     
  -23.0320271189498       -23.3387169596183       -23.5562837035321     
  -23.8080836311511       -24.3663069668932     
 -2.140368759977052E-003  0.000000000000000E+000
  0.992904015613748       0.000000000000000E+000
  0.995825097478536       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
