         180           8
  -1.08302280294899       -1.48686541678365       -1.86366156866771     
  -2.21261460096117       -2.48518805558791       -2.70073215803227     
  -2.88868876428864       -2.84442870955086     
  -21.9028100759444       -22.0577424088337       -22.3189220310399     
  -22.9172261871451       -23.6796191026379       -24.0034275737094     
  -24.2270166422096       -24.5333337946967     
 -2.190866170395332E-003  0.000000000000000E+000
  0.993128295639532       0.000000000000000E+000
  0.995949808862458       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
