         180           8
 -0.459064379938719      -6.924842112169718E-002  0.428623165979704     
  0.945790906810871        1.46909664778700        2.00295543292923     
   2.52568250212084        3.07115955106931     
   11.7895639281691        12.0199994435562        12.2170305980434     
   12.4065651026125        12.5673848089473        12.7339265606740     
   12.9367008657634        13.1412143767928     
 -7.656851042683951E-004  0.000000000000000E+000
   1.00145195249281       0.000000000000000E+000
  0.998364359013473       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
